D (rad)

0.5

1

1.5

< 4 GeV/c a T 3 < p

(GeV/c) T bp 0 1 2 3 4 5 0.5

1

1.5

< 5 GeV/c a T 4 < p

0.5

1

1.5

< 3 GeV/c a T 2 < p

0-20% Au+Au

FIT1 FIT2