0.270.260.250.240.230.22

E in FCAL LAr [GeV] for 20-GeV e-

0.001

234567890.01234567890.1234567891Physics cut [mm]

4.354.304.254.204.15

E in HEC LAr [GeV] for 100-GeV e-

0.001

234567890.01234567890.1234567891Physics cut [mm]

4.14.03.93.83.73.63.5

E in EMEC LAr [GeV] for 20-GeV e-

0.001

234567890.01234567890.1234567891Physics cut [mm]