T/E_T EΔ

-1 -0.5 0 0.5 1 1.5 2 0

20

40

60

80

100

120 (truth-recon)

T/E_T EΔ / ndf ^2χ 547.8 / 23

Constant 3.4±

105.1 Mean 0.01105 ± -0.09907 Sigma 0.0106 ± 0.3881

T/E_T EΔ