/ ndf

2χ 84.53 / 53 Constant 1.84± 57.61 Mean 0.002898 ± 0.007634 Sigma 0.0024 ± 0.1102

jet ηΔ -0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

Counts

0 10 20 30 40 50 60 70 80 ± ±

(truth-recon) ηΔ