jet ϕΔ -0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

Counts

0 10 20 30 40 50 60 70 80 (truth-recon) ϕΔ^{/ ndf2χ} 120 / 48

Constant 1.92±

59.27 Mean 0.002880 ± 0.004517 Sigma 0.0024 ± 0.1073

ϕΔ