/ ndf

2χ 20 / 21 Constant 3.63±

93.63 Mean 1.45e-03 ± 2.52e-05 Sigma 0.00116 ± 0.04568

jetηΔ -0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

Counts

0

20

40

60

80

100 ± ±

(truth-recon) ηΔ