jetϕΔ -0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

Counts

0 20 40 60 80 100 120 140 (truth-recon) ϕΔ^{/ ndf2χ} 43.61 / 20

Constant 4.3±

112.6 Mean 0.001171 ± -0.002275 Sigma 0.00087 ± 0.03773

ϕΔ