/ ndf

2χ 28.99 / 16 Constant 5.2±

139.1 Mean 0.00098 ± -0.00229 Sigma 0.00074 ± 0.03231

jetηΔ -0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

Counts

0 20 40 60 80 100 120 140 ± ±

(truth-recon) ηΔ