jetϕΔ -0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

Counts

0 20 40 60 80 100 120 140 160 180 200 220 (truth-recon) ϕΔ^{/ ndf2χ} 48.26 / 11

Constant 7.2±

193.5 Mean 0.00070 ± 0.00124 Sigma 0.00052 ± 0.02291

ϕΔ