T/E_T EΔ

-1 -0.5 0 0.5 1 1.5 2 0

50

100

150

200

250 (truth-recon)

T/E_T EΔ / ndf ^2χ 2099 / 9

Constant 7.8±

236.8 Mean 0.0044 ± -0.1418 Sigma 0.0039 ± 0.1593

T/E_T EΔ