/ ndf

2χ 2377 / 17 Constant 5.6± 175.1 Mean 0.000920 ± -0.001831 Sigma 0.00071 ± 0.03542

jet ηΔ -0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

Counts

0 20 40 60 80 100 120 140 160 180 200 ± ±

(truth-recon) ηΔ