1 10 Energy [GeV]

0.2 0.3 0.4 0.5 0.6 0.7

Time Resolution [ns]

=13 TeV s, ^{-1}

L = 3.3 fb ∫ ee data →Z EMEC

| < 2.47 η 1.52 < |

1 p⊕E^0 p ( t ) = σ Fit Results:

High : 1.759 0p : 0.305 1p Medium : 6.658 0p : 0.217 1p