30 40 50 60^210^210×2 Energy[GeV] 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Time Resolution [ns]

ν e →W Medium Gain

EMEC Slot 14

0.003 ± : 5.630 0p 0.003 ± : 0.233 1p