1− 0.8− 0.6− 0.4− 0.2− 0 0.2 0.4 0.6 0.8 1 [0.025 units] ηδ 2.5 − 2− 1.5 − 1− 0.5 − 0 0.5 1 1.5 2 2.5

Time [ns]

High Gain Pass 7

EMECC Slot 14