250 − 200− 150− 100− 50− 0 50 100 150 200 250

Difference in Flight Path[mm]

1.2 − 1− 0.8 − 0.6 − 0.4 − 0.2 − 0 0.2 0.4 0.6

Cell time [ns]

Entries: 1690499 Mean: -0.657 Rms: 0.488

High Gain All

Eta Range [0.329,0.274]

Fit: m=0.003401 Fit: dm=0.000034 Fit: b=-0.662974 Fit: db=0.000379