250 − 200− 150− 100− 50− 0 50 100 150 200 250

Difference in Flight Path[mm]

1.8 − 1.6 − 1.4 − 1.2 − 1− 0.8 − 0.6 − 0.4 − 0.2 − 0 0.2

Cell time [ns]

Entries: 69863 Mean: -0.768 Rms: 0.683

Medium Gain All

Eta Range [0.438,0.384]

Fit: m=0.003169 Fit: dm=0.000179 Fit: b=-0.774931 Fit: db=0.002607