250 − 200− 150− 100− 50− 0 50 100 150 200 250

Difference in Flight Path[mm] 2.5 − 2− 1.5 − 1− 0.5 − 0

Cell time [ns]

Entries: 25946 Mean: -0.935 Rms: 0.598

Medium Gain All

Eta Range [-1.151,-1.206]

Fit: m=0.003692 Fit: dm=0.000113 Fit: b=-0.926026 Fit: db=0.003637