30− 20− 10− 0 10 20 30

Time [ns]

1

10

210

310

Events / 0.02 ns

: -0.002 ns μ : 0.255 ns σ

High Gain Pass 7

EMECA Slot 14

Entries: 2530 Mean: 0.000 Rms: 0.268