30− 20− 10− 0 10 20 30

Time [ns]

1

10

210

310

Events / 0.02 ns

: -0.003 ns μ : 0.258 ns σ

High Gain Pass 7

EMECA Slot 15

Entries: 6114 Mean: -0.000 Rms: 0.261