250 − 200− 150− 100− 50− 0 50 100 150 200 250

Geometric Difference [mm] 2.5 − 2− 1.5 − 1− 0.5 − 0 0.5 1 1.5 2 2.5

Cell time [ns]

Entries: 104742154 Mean: -0.936 Rms: 0.573

High Gain All

Fit: m=0.000453 Fit: dm=0.000002 Fit: b=-0.935730 Fit: db=0.000056