30− 20− 10− 0 10 20 30

Time [ns] 0

20

40

60

80

100 310 ×

Events / 0.02 ns

: -0.001 ns μ : 0.281 ns σ

High Gain Pass 7

EMECA Slot 11

Entries: 3460622 Mean: -0.000 Rms: 0.289