30− 20− 10− 0 10 20 30

Time [ns] 0 500 1000

1500

2000

2500

3000

3500

4000

Events / 0.02 ns

: 0.002 ns μ : 0.274 ns σ

Medium Gain Pass 7

EMECA Slot 15

Entries: 133920 Mean: 0.000 Rms: 0.274