30− 20− 10− 0 10 20 30

Time [ns] 0 50 100 150 200 250 300 350 400 450

Events / 0.02 ns

: -0.002 ns μ : 0.266 ns σ

High Gain Pass 7

EMECC Slot 14

Entries: 13544 Mean: -0.000 Rms: 0.272