hFitPar0 Entries 100 Mean 1.703 RMS 0.06442 Underflow 0 Overflow 0 / ndf

2χ 13.96 / 5 Prob 0.01585 Constant 4.038± 22.78 Mean 0.008436 ± 1.701 Sigma 0.009088 ± 0.06071

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 0

5

10

15

20

25

± ±

Param: <tau>_{hFitErr0}

Entries 100 Mean 0.04866 RMS 0.001876 Underflow 0 Overflow 0 / ndf

2χ 9.649e-10 / -1 Prob 0 Constant 103.2± 84.41 Mean 0.004148 ± 0.04952 Sigma 0.005109 ± 0.003902

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

10

20

30

40

50

60

70 hFitErr0

± ±

Error: <tau>

hFitPar1 Entries 100 Mean 15.18 RMS 0.5625 Underflow 0 Overflow 0 / ndf

2χ 30.48 / 15 Prob 0.01031 Constant 5.05± 26.48 Mean 0.03015± 15.09 Sigma 0.03103± 0.2095

10 11 12 13 14 15 16 17 18 19 20 0

5

10

15

20

25

Param: delta(m)_{hFitErr1}

Entries 100 Mean 0.09606 RMS 0.04151 Underflow 0 Overflow 0 / ndf

2χ 4.884 / 3 Prob 0.1805 Constant 5.482± 40.23 Mean 0.004218 ± 0.09223 Sigma 0.003535 ± 0.03794

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 5 10 15 20 25 30 35 40 hFitErr1

± ±

Error: delta(m)

hFitPar2 Entries 100 Mean 0.4315 RMS 0.02009 Underflow 0 Overflow 0 / ndf

2χ 5.123e-10 / 0 Prob 0 Constant 9.233± 71.42 Mean 0.002315 ± 0.432 Sigma 0.001944 ± 0.02254

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 1.2 0

10

20

30

40

50

60

± ±

Param: P(mis-tag)_{hFitErr2}

Entries 100 Mean 0.02008 RMS 0.0002699 Underflow 0 Overflow 0 / ndf

2χ 100 / -2 Prob 0 Constant 1.414±

1.748e+09 Mean 4.855e-11 ± 0.026 Sigma 4.754e-10 ± 9.131e-11

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100 hFitErr2

± ±

Error: P(mis-tag)