h10 Entries 60987 Mean 0.02467 RMS 0.01714 Underflow 0 Overflow 1.573e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000

N(mix) vs lambda(Pt,Lt,Kt) - true mix h12 Entries 61021 Mean 0.02458 RMS 0.01721 Underflow 0 Overflow 1.591e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0 100 200 300 400 500 600 700 800 h12 N(mix) vs lambda(Pt,Lt,Kt) - smear mix

h14 Entries 60987 Mean 0.02513 RMS 0.01727 Underflow 0 Overflow 1.953e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0 100 200 300 400 500 600 700 800 N(mix) vs lambda(Pt,Lt) - true mix h16 Entries 60987 Mean 0.02467 RMS 0.01714 Underflow 0 Overflow 1.573e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000 h16 N(mix) vs lambda(Pm,Lm,Kt) - true mix

h18 Entries 61021 Mean 0.02501 RMS 0.01737 Underflow 0 Overflow 1.965e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

100

200

300

400

500

600

N(mix) vs lambda(meas) - smear mix