h10 Entries 22893 Mean 0.1043 RMS 0.05293 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

200

400

600

800

1000

N(mix) vs lambda(Pt,Lt,Kt) - true mix h12 Entries 38233 Mean 0.0672 RMS 0.05615 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

500

1000

1500

2000

2500 h12 N(mix) vs lambda(Pt,Lt,Kt) - smear mix

h14 Entries 22893 Mean 0.129 RMS 0.08358 Underflow 0 Overflow 50

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0 100 200 300 400 500 600 700

N(mix) vs lambda(Pt,Lt) - true mix h16 Entries 22893 Mean 0.1043 RMS 0.05293 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

200

400

600

800

1000 h16 N(mix) vs lambda(Pm,Lm,Kt) - true mix

h18 Entries 38233 Mean 0.08306 RMS 0.07923 Underflow 0 Overflow 41

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

N(mix) vs lambda(meas) - smear mix