hDataFit0 Entries 61395 Mean 0.0286 RMS 0.02087 Underflow 0 Overflow 1.562e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0

200

400

600

800

1000

N(unmix) vs lambda (cm)

hDataFit1 Entries 61021 Mean 0.02874 RMS 0.02066 Underflow 0 Overflow 1.58e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0 100 200 300 400 500 600 700 800 N(mix) vs lambda (cm)

hAsymData Entries 152 Mean 0.02373 RMS 0.02278 Underflow 0 Overflow -0.005857

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07

-0.4

-0.2

0

0.2

0.4

0.6 (Unm-Mix)/(Unm+Mix) vs lambda (cm)