hDataFit0 Entries 84183 Mean 0.04583 RMS 0.05211 Underflow 0 Overflow 33

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

N(unmix) vs lambda (cm)

hDataFit1 Entries 38233 Mean 0.08306 RMS 0.07923 Underflow 0 Overflow 41

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400

N(mix) vs lambda (cm)

hAsymData Entries 152 Mean 0.4043 RMS 0.2338 Underflow 0 Overflow -0.1081

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-2

-1

0

1

2

(Unm-Mix)/(Unm+Mix) vs lambda (cm)