hFitPar0 Entries 100 Mean 1.531 RMS 0.05143 Underflow 0 Overflow 0 / ndf

2χ 5.663 / 4 Prob 0.2258 Constant 3.729± 27.58 Mean 0.006761 ± 1.53 Sigma 0.0052±

0.05516

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 0

5

10

15

20

25

±

Param: <tau>_{hFitErr0}

Entries 100 Mean 0.04815 RMS 0.001679 Underflow 0 Overflow 0 / ndf

2χ 9.752e-10 / -1 Prob 0 Constant 114.2± 77.7 Mean 0.002584 ± 0.04874 Sigma 0.006953 ± 0.004269

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

10

20

30

40

50

60 hFitErr0

± ±

Error: <tau>

hFitPar1 Entries 100 Mean 14.99 RMS 0.5744 Underflow 0 Overflow 0 / ndf

2χ 14.94 / 13 Prob 0.3109 Constant 2.645± 14.08 Mean 0.05593± 14.98 Sigma 0.08008± 0.4881

10 11 12 13 14 15 16 17 18 19 20 0 2 4 6 8 10 12 14 16 18 20 22 Param: delta(m)_{hFitErr1}

Entries 100 Mean 0.5126 RMS 0.2616 Underflow 0 Overflow 0 / ndf

2χ 20.56 / 21 Prob 0.486 Constant 1.055± 6.414 Mean 0.03519± 0.4468 Sigma 0.03804± 0.2138

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

2

4

6

8

10 hFitErr1

Error: delta(m)

hFitPar2 Entries 100 Mean 0.2072 RMS 0.04895 Underflow 0 Overflow 0 / ndf

2χ 2.992 / 4 Prob 0.5591 Constant 3.742± 28.54 Mean 0.005833 ± 0.2042 Sigma 0.004979 ± 0.0549

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 1.2 0

5

10

15

20

25

30

± ±

Param: P(mis-tag)_{hFitErr2}

Entries 100 Mean 0.04746 RMS 0.003322 Underflow 0 Overflow 0 / ndf

2χ 1.164e-11 / 0 Prob 0 Constant 14.37± 83.97 Mean 0.0003673 ± 0.04758 Sigma 0.0004811 ± 0.00389

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

10

20

30

40

50 hFitErr2

± ±

Error: P(mis-tag)