hDataFit0 Entries 61429 Mean 0.02789 RMS 0.02063 Underflow 0 Overflow 1.199e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0

200

400

600

800

1000

1200

1400

N(unmix) vs ct0 (cm)

hDataFit1 Entries 60987 Mean 0.02799 RMS 0.0202 Underflow 0 Overflow 1.207e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0

200

400

600

800

1000

1200

N(mix) vs ct0 (cm)

hAsymData Entries 152 Mean 0.03783 RMS 0.02184 Underflow 0 Overflow -0.003284

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 -1

-0.5

0

0.5

1

(Unm-Mix)/(Unm+Mix) vs ct0 (cm)