hFitPar0 Entries 100 Mean 1.542 RMS 0.04618 Underflow 0 Overflow 0 / ndf

2χ 1.79 / 4 Prob 0.7743 Constant 4.019± 32.39 Mean 0.005785 ± 1.549 Sigma 0.004406 ± 0.05181

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 0 5 10 15 20 25 30 35

± ±

Param: <tau>_{hFitErr0}

Entries 100 Mean 0.04405 RMS 0.001226 Underflow 0 Overflow 0 / ndf

2χ 100 / -2 Prob 0 Constant 1.414±

3.704e+08 Mean 5.04e-10± 0.0572 Sigma 2.243e-09 ± 4.308e-10

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100 hFitErr0

±

Error: <tau>

hFitPar1 Entries 100 Mean 15 RMS 0.0141 Underflow 0 Overflow 0 / ndf

2χ 2.306e-11 / -1 Prob 0 Constant 118.6± 75.39 Mean 0.02228± 15 Sigma 0.1961± 0.1104

10 11 12 13 14 15 16 17 18 19 20 0

10

20

30

40

50

Param: delta(m)_{hFitErr1}

Entries 100 Mean 0.01369 RMS 0.002357 Underflow 0 Overflow 0 / ndf

2χ 100 / -2 Prob 0 Constant 1.414±

8.738e+09 Mean 9.711e-12 ± 0.026 Sigma 4.754e-10 ± 9.131e-11

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

20

40

60

80

100 hFitErr1

± ±

Error: delta(m)

hFitPar2 Entries 100 Mean -0.004593 RMS 0.009912 Underflow 0 Overflow 0 / ndf

2χ 2.598e-09 / -1 Prob 0 Constant 108.7± 80.47 Mean 0.0175±

-0.005621 Sigma 0.03032±

0.02055

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 1.2 0

10

20

30

40

50

60

Param: P(mis-tag)_{hFitErr2}

Entries 100 Mean 0.0064 RMS 0.001481 Underflow 0 Overflow 0 / ndf

2χ 4.244e-10 / -1 Prob 0 Constant 108.6± 97.53 Mean 0.004739 ± 0.005786 Sigma 0.003413 ± 0.003268

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 10 20 30 40 50 60 70 80 hFitErr2

± ±

Error: P(mis-tag)