h9 Entries 61429 Mean 0.0245 RMS 0.01759 Underflow 0 Overflow 1.578e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000

N(unmix) vs lambda(Pt,Lt,Kt) - true mix h11 Entries 61395 Mean 0.0246 RMS 0.01752 Underflow 0 Overflow 1.559e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0 100 200 300 400 500 600 700 800 900 h11 N(unmix) vs lambda(Pt,Lt,Kt) - smear mix

h13 Entries 61429 Mean 0.02483 RMS 0.0178 Underflow 0 Overflow 1.953e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000

N(unmix) vs lambda(Pt,Lt) - true mix h15 Entries 61429 Mean 0.0245 RMS 0.01759 Underflow 0 Overflow 1.578e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000

h15 N(unmix) vs lambda(Pm,Lm,Kt) - true mix

h17 Entries 61395 Mean 0.02496 RMS 0.01771 Underflow 0 Overflow 1.941e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0 100 200 300 400 500 600 700 800 N(unmix) vs lambda(meas) - smear mix