hKF_ave Entries 125012 Mean 0.881 RMS 0.2418 Underflow 0 Overflow 1236

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

1000

2000

3000

4000

5000

K-Factor: All Pt

hKF_kin Entries 22443 Mean 0.8917 RMS 0.1467 Underflow 0 Overflow 3

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 200 400 600 800 1000

1200

1400

1600

K-Factor: in Kin Acc

0 2 4 6 8 10 12 14 16 18 20 22

0.4

0.6

0.8

1

1.2

K-Factor vs Pt