hDataFit0 Entries 87010 Mean 0.04307 RMS 0.04837 Underflow 0 Overflow 9

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

2000

4000

6000

8000

10000

N(unmix) vs lambda (cm)

hDataFit1 Entries 38002 Mean 0.07804 RMS 0.076 Underflow 0 Overflow 20

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

500

1000

1500

2000

2500

N(mix) vs lambda (cm)

hAsymData Entries 152 Mean 0.415 RMS 0.2234 Underflow 0 Overflow -0.3793

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-2

-1

0

1

2

(Unm-Mix)/(Unm+Mix) vs lambda (cm)