hFitPar0

Entries 100 Mean 1.585 RMS 0.05227 Underflow 0 Overflow 0

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 0

5

10

15

20

25

30

35 Param: <tau> hFitErr0 Entries 100 Mean 0.04482 RMS 0.001479 Underflow 0 Overflow 0

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100 hFitErr0

Error: <tau>

hFitPar1

Entries 100 Mean 0.439 RMS 0.09417 Underflow 0 Overflow 0

-4 -3 -2 -1 0 1 2 3 4 5 0 10 20 30 40 50 60 70 80 90 Param: delta(m) hFitErr1 Entries 100 Mean 0.02977 RMS 0.005379 Underflow 0 Overflow 0

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 10 20 30 40 50 60 70 80 90 hFitErr1

Error: delta(m)

hFitPar2

Entries 100 Mean 0.2145 RMS 0.01381 Underflow 0 Overflow 0

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 1.2 0 10 20 30 40 50 60 70 80

Param: P(mis-tag) hFitErr2 Entries 100 Mean 0.0148 RMS 0.0003669 Underflow 0 Overflow 0

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100 hFitErr2

Error: P(mis-tag)