h9 Entries 103361 Mean 0.03148 RMS 0.02986 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

2000

4000

6000

8000

10000

12000

14000

N(unmix) vs lambda(Pt,Lt,Kt) - true mix h11 Entries 87010 Mean 0.03488 RMS 0.03467 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

2000

4000

6000

8000

10000 h11 N(unmix) vs lambda(Pt,Lt,Kt) - smear mix

h13 Entries 103361 Mean 0.03883 RMS 0.04185 Underflow 0 Overflow 14

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

2000

4000

6000

8000

10000

12000

N(unmix) vs lambda(Pt,Lt) - true mix h15 Entries 103361 Mean 0.03148 RMS 0.02986 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

2000

4000

6000

8000

10000

12000

14000 h15 N(unmix) vs lambda(Pm,Lm,Kt) - true mix

h17 Entries 87010 Mean 0.04307 RMS 0.04837 Underflow 0 Overflow 9

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

2000

4000

6000

8000

10000

N(unmix) vs lambda(meas) - smear mix