hFitPar0

Entries 100 Mean 0.4457 RMS 0.03651 Underflow 0 Overflow 0

-4 -3 -2 -1 0 1 2 3 4 5 0 10 20 30 40 50 60 70 80 90 Param: delta(m) hFitErr0 Entries 100 Mean 0.0379 RMS 0.004316 Underflow 0 Overflow 0

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 10 20 30 40 50 60 70 hFitErr0

Error: delta(m)

hFitPar1

Entries 100 Mean 0.2224 RMS 0.01388 Underflow 0 Overflow 0

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 1.2 0 10 20 30 40 50 60 70 80 90 Param: P(mis-tag) hFitErr1 Entries 100 Mean 0.01985 RMS 0.000347 Underflow 0 Overflow 0

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100 hFitErr1

Error: P(mis-tag)