hDataFit0 Entries 103361 Mean 0.03148 RMS 0.02986 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0

2000

4000

6000

8000

10000

12000

14000

N(unmix) vs ct0 (cm)

hDataFit1 Entries 21651 Mean 0.1015 RMS 0.05221 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0 100 200 300 400 500 600 700 800 900 N(mix) vs ct0 (cm)

hAsymData Entries 152 Mean 0.2381 RMS 0.1446 Underflow 0 Overflow 0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-2

-1

0

1

2

(Unm-Mix)/(Unm+Mix) vs ct0 (cm)