hFitPar0

Entries 100 Mean 1.585 RMS 0.05228 Underflow 0 Overflow 0

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 0

5

10

15

20

25

30

35 Param: <tau> hFitErr0 Entries 100 Mean 0.04482 RMS 0.001479 Underflow 0 Overflow 0

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100 hFitErr0

Error: <tau>

hFitPar1 Entries 100 Mean 15.07 RMS 0.7086 Underflow 0 Overflow 0

10 11 12 13 14 15 16 17 18 19 20 0 2 4 6 8 10 12 14 16 18 20 22 Param: delta(m) hFitErr1 Entries 100 Mean 0.1163 RMS 0.06305 Underflow 0 Overflow 0

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 5 10 15 20 25 30 35 40 45 hFitErr1

Error: delta(m)

hFitPar2

Entries 100 Mean 0.4262 RMS 0.02187 Underflow 0 Overflow 0

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 1.2 0

10

20

30

40

50

60 Param: P(mis-tag) hFitErr2 Entries 100 Mean 0.0198 RMS 0.0002027 Underflow 0 Overflow 0

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

20

40

60

80

100 hFitErr2

Error: P(mis-tag)