h10 Entries 62487 Mean 0.02431 RMS 0.017 Underflow 0 Overflow 1.477e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000

N(mix) vs lambda(Pt,Lt,Kt) - true mix h12 Entries 62638 Mean 0.02427 RMS 0.01708 Underflow 0 Overflow 1.474e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0 100 200 300 400 500 600 700 800 h12 N(mix) vs lambda(Pt,Lt,Kt) - smear mix

h14 Entries 62487 Mean 0.02498 RMS 0.01729 Underflow 0 Overflow 1.831e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0 100 200 300 400 500 600 700 800

N(mix) vs lambda(Pt,Lt) - true mix h16 Entries 62487 Mean 0.02431 RMS 0.017 Underflow 0 Overflow 1.477e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000 h16 N(mix) vs lambda(Pm,Lm,Kt) - true mix

h18 Entries 62638 Mean 0.02486 RMS 0.01734 Underflow 0 Overflow 1.833e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

100

200

300

400

500

600

700 N(mix) vs lambda(meas) - smear mix