hDataFit0 Entries 62374 Mean 0.02783 RMS 0.02064 Underflow 0 Overflow 1.461e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0

200

400

600

800

1000

N(unmix) vs lambda (cm)

hDataFit1 Entries 62638 Mean 0.02827 RMS 0.02041 Underflow 0 Overflow 1.461e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0 100 200 300 400 500 600 700 800 900 N(mix) vs lambda (cm)

hAsymData Entries 152 Mean 0.02313 RMS 0.02289 Underflow 0 Overflow 0.0002053

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07

-0.4

-0.2

0

0.2

0.4

0.6

(Unm-Mix)/(Unm+Mix) vs lambda (cm)