hDataFit0 Entries 62525 Mean 0.02708 RMS 0.02042 Underflow 0 Overflow 1.102e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0

200

400 600

800 1000

1200

1400

N(unmix) vs ct0 (cm)

hDataFit1 Entries 62487 Mean 0.02754 RMS 0.02005 Underflow 0 Overflow 1.105e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0

200

400

600

800

1000

1200

N(mix) vs ct0 (cm)

hAsymData Entries 152 Mean 0.03767 RMS 0.02179 Underflow 0 Overflow -0.001133

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 -1

-0.5

0

0.5

1

(Unm-Mix)/(Unm+Mix) vs ct0 (cm)