h9 Entries 62525 Mean 0.02384 RMS 0.01739 Underflow 0 Overflow 1.474e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000

1200

N(unmix) vs lambda(Pt,Lt,Kt) - true mix h11 Entries 62374 Mean 0.02388 RMS 0.01732 Underflow 0 Overflow 1.477e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0 100 200 300 400 500 600 700 800 900 h11 N(unmix) vs lambda(Pt,Lt,Kt) - smear mix

h13 Entries 62525 Mean 0.02425 RMS 0.01755 Underflow 0 Overflow 1.836e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000

N(unmix) vs lambda(Pt,Lt) - true mix h15 Entries 62525 Mean 0.02384 RMS 0.01739 Underflow 0 Overflow 1.474e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0

200

400

600

800

1000

1200 h15 N(unmix) vs lambda(Pm,Lm,Kt) - true mix

h17 Entries 62374 Mean 0.02436 RMS 0.0175 Underflow 0 Overflow 1.834e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0 100 200 300 400 500 600 700 800 900 N(unmix) vs lambda(meas) - smear mix