hFitPar0 Entries 100 Mean 15.6 RMS 1.186 Underflow 0 Overflow 1

10 11 12 13 14 15 16 17 18 19 20 0

2

4

6

8

10

12 Param: delta(m) hFitErr0

Entries 100 Mean 0.4813 RMS 0.2362 Underflow 0 Overflow 0

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 2 4 6 8 10 12 14 16 hFitErr0

Error: delta(m)

hFitPar1

Entries 100 Mean 0.4114 RMS 0.01987 Underflow 0 Overflow 0

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 1.2 0

10

20

30

40

50

60

70 Param: P(mis-tag) hFitErr1 Entries 100 Mean 0.02464 RMS 0.0003931 Underflow 0 Overflow 0

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 10 20 30 40 50 60 70 80 90 hFitErr1

Error: P(mis-tag)