B_pt

Entries 125012 Mean 4.965 RMS 2.997 Underflow 0 Overflow 127

0 5 10 15 20 25 10

10^2

10^3

10^4

Bs-bar: Pt (GeV) B_eta Entries 125012 Mean 0.0118 RMS 2.036 Underflow 2267 Overflow 2231

-4 -3 -2 -1 0 1 2 3 4

10^3

B_eta

Bs-bar: eta

B_t0t Entries 125012 Mean 1.436 RMS 1.402 Underflow 0 Overflow 242 / ndf

2χ 119.7 / 88 Prob 0.01396 Constant 0.004077 ± 9.06 Slope 0.002046 ± -0.689

0 1 2 3 4 5 6 7 8 9

10

10^2

10^3

10^4

± ±

Bs-bar: t0(t) (ps) B_lxy

Entries 125012 Mean 0.04006 RMS 0.05096 Underflow 0 Overflow 114

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5

10

10^2

10^3

10^4

B_lxy

Bs-bar: Lxy (cm)

B_t0l Entries 125012 Mean 1.436 RMS 1.403 Underflow 0 Overflow 242 / ndf

2χ 118.4 / 88 Prob 0.0169 Constant 0.004078 ± 9.06 Slope 0.002045 ± -0.6888

0 1 2 3 4 5 6 7 8 9 10

10^2

10^3

10^4

± ±

Bs-bar: t0(L) (ps) B_l_t Entries 125012 Mean 6.946e-05 RMS 0.0004755 Underflow 27 Overflow 259

-0.01 -0.008 -0.006 -0.004 -0.002 0 0.002 0.004 0.006 0.008 0.01 1

10

10^2

10^3

10^4

10^5

B_l_t

Bs-bar: t0(Lxy)-t0(t)