B_t0t_dat_fit

Entries 125012 Mean 6.498 RMS 2.087 Underflow 0 Overflow 242

0 1 2 3 4 5 6 7 8 9

-0.4

-0.2

0

0.2

0.4

0.6 t0: Data-Fit/Fit