hdt0_all_acc

Entries 125012 Mean 0.2831 RMS 0.7038 Underflow 9 Overflow 941

-5 -4 -3 -2 -1 0 1 2 3 4 5 0

5000

10000

15000

20000

25000

30000

t0(true)-t0(meas) (ps): All Accept

hdt0_all0

Entries 29958 Mean 0.0432 RMS 0.1036 Underflow 0 Overflow 3

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 2000

4000

6000

8000

10000

12000

14000

16000

t0(true)-t0(meas) (ps): All t0(tr) = 0 - 0.4 hdt0_all1 Entries 23279 Mean 0.1354 RMS 0.2766 Underflow 0 Overflow 8

-5 -4 -3 -2 -1 0 1 2 3 4 5 0

1000

2000

3000

4000

5000

6000

7000

hdt0_all1

t0(true)-t0(meas) (ps): All t0(tr) = 0.4 - 0.8

hdt0_all2

Entries 17187 Mean 0.2314 RMS 0.4352 Underflow 0 Overflow 15

-5 -4 -3 -2 -1 0 1 2 3 4 5 0

500

1000

1500

2000

2500

3000

t0(true)-t0(meas) (ps): All t0(tr) = 0.8 - 1.2 hdt0_all3 Entries 54588 Mean 0.4976 RMS 0.9783 Underflow 9 Overflow 915

-5 -4 -3 -2 -1 0 1 2 3 4 5 0

1000

2000

3000

4000

5000

hdt0_all3

t0(true)-t0(meas) (ps): All t0(tr) = 1.2 - 999