hdt0_kin_acc

Entries 22443 Mean 0.223 RMS 0.4866 Underflow 0 Overflow 28

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 1000

2000

3000

4000

5000

6000

7000

8000

t0(true)-t0(meas) (ps): Kinem Accept

hdt0_kin0

Entries 5319 Mean 0.03005 RMS 0.05631 Underflow 0 Overflow 0

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 500 1000

1500

2000

2500

3000

3500

t0(true)-t0(meas) (ps): Kinem t0(tr) = 0 - 0.4 hdt0_kin1 Entries 4252 Mean 0.09243 RMS 0.1453 Underflow 0 Overflow 0

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 200 400 600 800 1000

1200

1400

1600

1800

hdt0_kin1

t0(true)-t0(meas) (ps): Kinem t0(tr) = 0.4 - 0.8

hdt0_kin2 Entries 3081 Mean 0.1637 RMS 0.2393 Underflow 0 Overflow 0

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 100 200 300 400 500 600 700 800 900 t0(true)-t0(meas) (ps): Kinem t0(tr) = 0.8 - 1.2 hdt0_kin3

Entries 9791 Mean 0.4037 RMS 0.6731 Underflow 0 Overflow 28

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 200 400 600 800 1000

1200

1400

hdt0_kin3

t0(true)-t0(meas) (ps): Kinem t0(tr) = 1.2 - 999