hDataFit0 Entries 125012 Mean 0.02805 RMS 0.02053 Underflow 0 Overflow 2.922e+04

0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0

200

400

600

800

1000

1200

N(all) vs lambda (cm)