hFitPar0 Entries 500 Mean 1.585 RMS 0.1158 Underflow 0 Overflow 0

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 0 10 20 30 40 50 60 70

Param: <tau> hFitErr0 Entries 500 Mean 0.1002 RMS 0.007321 Underflow 0 Overflow 0

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 20 40 60 80 100 120 140 160 180 200 hFitErr0

Error: <tau>